DROP TABLE IF EXISTS `field_group`;

CREATE TABLE `field_group` (
  `field_group_id` int NOT NULL AUTO_INCREMENT,
  `type` varchar(128) NOT NULL DEFAULT 'post',
  `subtype` varchar(128) NOT NULL DEFAULT 'page',
  `conditions` text,
  `status` tinyint NOT NULL,
  `sort_order` int NOT NULL NOT NULL DEFAULT 0,
  PRIMARY KEY (`field_group_id`)
) ENGINE=InnoDB AUTO_INCREMENT=1 DEFAULT CHARSET=utf8mb4;
