DROP TABLE IF EXISTS `role`;

CREATE TABLE `role` (
  `role_id` INT UNSIGNED NOT NULL AUTO_INCREMENT,
  `name` varchar(191) NOT NULL,
  `display_name` varchar(191) NOT NULL,
  `permissions` TEXT NOT NULL,
  PRIMARY KEY (`role_id`)
) ENGINE=InnoDB AUTO_INCREMENT=1 DEFAULT CHARSET=utf8mb4;
